/* FONTS */

/* ===============================
   Custom Fonts – Elementor Free
   Location: /wp-content/uploads/fonts
   =============================== */

/* URW DIN COND */
@font-face {
  font-family: 'URW DIN Cond';
  src: url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/URWDINCond-Regular.woff2') format('woff2'),
       url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/URWDINCond-Regular.woff') format('woff');
  font-weight: normal;
  font-style: normal;
  font-display: swap;
}

/* URW DIN */
@font-face {
  font-family: 'URW DIN';
  src: url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/URWDIN-Regular.woff2') format('woff2'),
       url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/URWDIN-Regular.woff') format('woff');
  font-weight: normal;
  font-style: normal;
  font-display: swap;
}

/* Allstar4 */
@font-face {
  font-family: 'Allstar4';
  src: url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/Allstar4.woff2') format('woff2'),
       url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/Allstar4.woff') format('woff');
  font-weight: normal;
  font-style: normal;
  font-display: swap;
}

/* Apple Braille Outline 6 Dot */
@font-face {
  font-family: 'Apple Braille';
  src: url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/AppleBraille-Outline6Dot.woff2') format('woff2'),
       url('http://192.168.75.205/Staging/taurus/wp-content/uploads/fonts/AppleBraille-Outline6Dot.woff') format('woff');
  font-weight: normal;
  font-style: normal;
  font-display: swap;
}

/* ===============================
   Utility Classes (Use in Elementor)
   =============================== */

.font-allstar4,
.font-allstar4 h2,
.font-allstar4 a,
.font-allstar4 p{
  font-family: 'Allstar4' !important;
}

.font-URW-cond {
    font-family: 'URW DIN Cond';
    font-weight: normal;
    font-style: normal;
}

.font-URW-din,
.font-URW-din a,
.font-URW-din h2,
.font-URW-din p {
    font-family: 'URW DIN' !important;
    font-weight: normal;
    font-style: normal;
}

.font-apple-braille,
.font-apple-braille a,
.font-apple-braille h2,
.font-apple-braille p {
  font-family: 'Apple Braille' !important;
}


/*  */


/* 3 post sec */

/* Wrapper */
.tf-latest-posts {
    display: flex;
    gap: 30px;
}

/* Card */
.tf-post-card {
    width: 33.33%;
    display: flex;
    flex-direction: column;
}

/* Image */
.tf-post-image img {
    width: 100%;
    height: 280px;
    object-fit: cover;
    display: block;
}

/* Content */
.tf-post-content {
    margin-top: 15px;
    color: #fff;
}

/* Title */
.tf-post-title {
    font-size: 20px;
    font-weight: 700;
    margin-bottom: 10px;
}

.tf-post-title a {
    color: #fff;
    text-decoration: none;
}

.tf-post-title a:hover {
    text-decoration: underline;
}

/* Excerpt – 2 lines only */
.tf-post-excerpt {
    font-size: 14px;
    line-height: 1.6;
    margin-bottom: 10px;

    display: -webkit-box;
    -webkit-line-clamp: 2;
    -webkit-box-orient: vertical;
    overflow: hidden;
}

/* Date */
.tf-post-date {
    font-size: 13px;
    opacity: 0.8;
}

/* Responsive */
@media (max-width: 1024px) {
    .tf-latest-posts {
        flex-direction: column;
    }

    .tf-post-card {
        width: 100%;
    }

    .tf-post-image img {
        height: 240px;
    }
}


/*  */

.Join-US-frm {
    display: grid;
    grid-template-columns: 1.7fr 0.3fr;
    gap: 20px;
    max-width: 500px;
}
.Join-US-frm .wpcf7-submit {
    padding: 0px 25px !important;
    background: transparent !important;
    border: 1px solid #fff !important;
}
.Join-US-frm input,
.Join-US-frm .wpcf7-submit {
    max-height: 45px;
    height: 45px;
    border-radius: 8px !important;
}

.red-btn-menu a {
    background: #c01e2e;
    border-radius: 8px;
    color: #fff !important;
    max-height: 30px;
    padding-top: 3px !important;
    margin-top: 3px;
}
.red-btn-menu a:hover {
    background: #b01b2a !important;
    color: #fff !important;
}

@media (max-width: 767px) {

    .Join-US-frm {
        grid-template-columns: 1fr;
        width: 90%;
        margin: 0 auto;
        gap: 0;
    }
    
    
    .Join-US-frm input, .Join-US-frm .wpcf7-submit {
        width: 100%;
        margin-bottom: 0;
    }


}